78 4 2 phen.names: TISSUE_SLICE TISSUE_SLICE.1 col.phen: #66C2A5 #FC8D62 #8DA0CB #E78AC3
# normal tumor normal tumor
normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor
normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal normal tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor tumor
